447Xi 17" Monitor

The 447Xi offers exceptional picture quality for demanding spreadsheet, CAD/CAM and DTP applications. The monitor can be adjusted perfectly with the on-screen menu. The Trinitron tube with dynamic focus, excellent anti-reflection treatment and TCO95 approval are the best factors for an ergonomic, safe and ecological monitor.

17" (15,71" = 399 mm viewable area) Trinitron Monitor 0,25 mm aperture grill Horizontal frequency 31-92 kHz Max. resolution: 1280 x 1024, 85 Hz MPRII, TCO95, TÜV-Ergo Plug & Play with DDC level 1/2AB PowerSaver according to VESA DPMS On Screen Menu (OSM) for easiest monitor control

Technical specifications

Windows 95 drivers for Nokia monitors

[main page | products | group | faq | feedback | search]

© Nokia 1995-1997. Read our legal notice.